11mm Grip - Print Exclusion Zone - Switch Off TEMPLATE Layer to hide these details

•    Standard Window Size 28 x 95mm
•    Barcode Window Size 38 x 95mm

DLX ENVELOPE - Wallet
Size 235 x 120mm
Plain Face & Window type
Peel & Seal
NOTE - Peel & Seal is only  available with Barcode Window Size 38 x 95mm